3 3.5 4 4.5 5 5.5 6 (fm) R

1−10

1

)R(_ϕC

ϕ Direct ϕ Direct and FSI

−K^+ K 10% − 0 30% −10 50% −30

= 2.76 TeV NNs Pb − ALICE Pb

ALI-PUB-544110

ALI-PUB-544110